\begin{picture}(0,0)%
\includegraphics{../figs/fibra_optica.pdf}%
\end{picture}%
\setlength{\unitlength}{4144sp}%
%
\begingroup\makeatletter\ifx\SetFigFontNFSS\undefined%
\gdef\SetFigFontNFSS#1#2#3#4#5{%
  \reset@font\fontsize{#1}{#2pt}%
  \fontfamily{#3}\fontseries{#4}\fontshape{#5}%
  \selectfont}%
\fi\endgroup%
\begin{picture}(4317,942)(1613,-2098)
\put(2251,-1771){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}Protectoras}%
}}}}
\put(2251,-1591){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}Cubiertas}%
}}}}
\put(5446,-1276){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}Revestimiendo}%
}}}}
\put(5446,-1681){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}N'ucleo}%
}}}}
\put(3916,-1591){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}Fibra}%
}}}}
\put(3916,-1771){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}'Optica}%
}}}}
\put(5446,-1816){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}(m'as denso)}%
}}}}
\put(5446,-1411){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}(menos denso)}%
}}}}
\end{picture}%
