\begin{picture}(0,0)%
\includegraphics{../figs/cable_coaxial.pdf}%
\end{picture}%
\setlength{\unitlength}{4144sp}%
%
\begingroup\makeatletter\ifx\SetFigFontNFSS\undefined%
\gdef\SetFigFontNFSS#1#2#3#4#5{%
  \reset@font\fontsize{#1}{#2pt}%
  \fontfamily{#3}\fontseries{#4}\fontshape{#5}%
  \selectfont}%
\fi\endgroup%
\begin{picture}(4861,1887)(488,-4708)
\put(2161,-4021){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}El'ectrico}%
}}}}
\put(2161,-3796){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}Aislante}%
}}}}
\put(3151,-3706){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}Conductor}%
}}}}
\put(3151,-3931){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}El'ectrico}%
}}}}
\put(3151,-4156){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}Externo}%
}}}}
\put(3961,-4066){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}El'ectrico}%
}}}}
\put(3961,-3841){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}Aislante}%
}}}}
\put(4996,-3076){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}Conductor}%
}}}}
\put(4996,-3301){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}El'ectrico}%
}}}}
\put(4996,-3526){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}Interno}%
}}}}
\put(1396,-2941){\makebox(0,0)[b]{\smash{{\SetFigFontNFSS{10}{12.0}{\familydefault}{\mddefault}{\updefault}{\color[rgb]{0,0,0}Cubierta de Pl'astico}%
}}}}
\end{picture}%
